            Fancy Font - Your Personal Typesetter

Parameters may be entered either from the command line or
interactively.  A '?' can always be typed to provide
assistance.  Generally parameters follow the format:

    <On/Off switch> <Parameter Name> <Parameter Value>

A switch is either '+' to turn on a parameter, or '-' to
turn off a parameter.  If the parameter is turned on, it may
require that a value be provided.

Special Characters:

'?'     always provides assistance

'RETURN' ends input - it can be used to Start Printing,
        to end a list or to end a parameter if you decide it is
        not the one you wanted.  ('RETURN' is ignored if it is
        not the first key you type on an input line and thus
        can be used to help in typing long lines).

'&'     Displays the current values and settings for all
        parameters. A convenient way to review current settings
        and view all the available parameters and their usage.

','     explicitly begins the interactive mode.  Use this
        at the end of the command line if you have additional
        parameters you wish to specify interactively.
        (example: Pfont +lm 1.2 +tm .5 ,)

'<'     allows you to cause the contents of a file to be used
        as input to Pfont (for parameter specifications) as if
        you were directly typing on the keyboard.  You will be
        asked to provide the name of a file from which
        parameters are to be read.

'Control-C'  Immediately leave Pfont (you will be prompted for
        confirmation).

'Control-V'  Print this information.

'Control-U'  Deletes the current input line.

'Back Space' (Control-H)  Delete previous character.


Once printing starts you can use the following commands:
(nothing will happen until a complete line is done printing)

'Control-P'  Stop printing current page and skip to the next
             page.

'Control-F'  Stop printing current file and skip to the next
             file.

'Control-C'  Stop all printing and immediately leave Pfont
             (you will be asked for confirmation).
        parameters you wish to specify in